Training Data

Positive Training (21 cases) 11 13 17 19 2 23 29 3 31 37 41 43 47 5 53 59 61 67 7 71 73 Negative Training (22 cases) 10 12 14 15 16 18 20 21 22 24 25 26 27 28 30 32 33 34 4 6 8 9 Anchors (5 dimensions) composite number orange prime record

Testing Results_{Positive tests Negative tests}

Positive 101, 103, 110 Predictions 107, 109, 79, 83, 89, 91, 97 Negative 36, 38, Predictions 40, 42, 44, 45, 46, 48, 49 Accuracy 18/19 = 94.74%